The ms6931 Driver
This section talks about using LCDproc with LCD displays that use the ms6931 chipset.

Configuration in LCDd.conf

[ms6931]
Device = DEVICE 	 device to use [default: /dev/ttyS1]
Size = 	 display size [default: 16x2]