The lcterm Driver
This section talks about using LCDproc with serial LCD displays from Helmut Neumark Elektronik.

Configuration in LCDd.conf

[lcterm]
Device = DEVICE 	 Default: /dev/lcd
Size = 	 Default: 16x2.