How to Obtain LCDproc

Versioning
At the time of writing the following majors versions of LCDproc are floating around on the internet:
LCDproc 0.5.9 	 LCDproc 0.5.9 is the current stable version of LCDproc. This is the version recommended to use.
Older releases 	 Older releases of LCDproc can be found on the GitHub project page at .

Download Git Version of LCDproc as a Tarball
The snapshot of the current source code repository may be downloaded from the web. Goto .
To extract the files run

$ tar xvfz lcdproc.tar.gz

Download The Latest Version of LCDproc from GitHub
Of course you can download the latest stuff from GitHub. For more information on how to use GitHub see .

$ git clone https://github.com/lcdproc/lcdproc.git

Once you've done that and want to update the downloaded files to the latest stuff you can use the "pull" command of git (make sure to be in the lcdproc directory!):

$ git pull